-68.2 -68 -67.8 -67.6 -67.4 -67.2 -67 -66.8

41.7

41.8

41.9

42

42.1

42.2 forecast run EN324NF FC.01

70

50

-- Q4.1 - Q4.3

-68.2 -68 -67.8 -67.6 -67.4 -67.2 -67 -66.8

41.8

41.85

41.9

41.95 42 42.05

42.1

42.15

42.2 forecast run EN324NF FC.02

70

50

-- Q4.1 - Q4.3

Latitude