-67.65 -67.6 -67.55 -67.5 -67.45 -67.4 -67.35

41.05

41.1

41.15

41.2

41.25 40

50

60

Longitude

Latitude run EN324 FC.10 & EN324 FC.14

run 10, surface drifter run 14, z=-30m