-68 -67.8 -67.6 -67.4 -67.2 -67 -66.8

40.5

40.6

40.7

40.8

40.9

41

41.1

41.2

41.3

41.4

41.5

FCAST_1.1B1/EN324_FC.01 Quoddy Simulation 3: rms error=0.10396 m/s

0.5 m/s 40 50 60 70

80 90 100