0 2 4 6 8 10 12 14 16 18 20

-200

-180

-160

-140

-120

-100

-80

-60

-40

-20

0

*

* Germination Rate (%/day)

temperature (deg. celsius)

**

*

*

*

**

*

*

*

depth (m)

1

2

3

4

5

6

7