-71 -70 -69 -68 -67 -66 -65

40.5 41 41.5 42 42.5 43 43.5 44 44.5 45 45.5 all stations (#22942)

-71 -70 -69 -68 -67 -66 -65

40.5 41 41.5 42 42.5 43 43.5 44 44.5 45 45.5

NO3 stations (#11477)

-71 -70 -69 -68 -67 -66 -65

40.5 41 41.5 42 42.5 43 43.5 44 44.5 45 45.5

NO3+NO2 stations (#14246)

-71 -70 -69 -68 -67 -66 -65

40.5 41 41.5 42 42.5 43 43.5 44 44.5 45 45.5

NO2 stations (#9072)