1987 1988 1989 1990 1991 1992 1993 20

22

24

26

28

Temperature ( oC) a)

0

0.5

1

1.5

2

Temperature variance ( oC)2

1979 1980 1981 1982 1983 1984 1985 1986 0

0.05

0.1

0.15

0.2

0.25

Time (years)

Chl (mg/m 3) b)

0

0.002

0.004

0.006

Chl variance (mg/m 3)2