-2-101234

0510 15 ADCP oc447 7ens edited, npts = 112 phase 0.960.970.980.9911.011.021.031.04

0510 15 amplitude 147148149150151152153154155156

-20-100 10 days time: nav - pc

-15-10-50510

01020 30 time: nav - pc

2008- 6- 4 9:25