148 149 150 151 152 153 154 155

0.96

0.965

0.97

0.975

0.98 scale

ADCP oc447 step size 1

148 149 150 151 152 153 154 155

-0.5

0

0.5

Angle

148 149 150 151 152 153 154 155 -5 0 5

Speed

148 149 150 151 152 153 154 155

-180 -90 0 90 180

Heading 2008/06/04 09:25:05 btcaluv.m step: 1, mean ph: 0.0589, amp: 0.9721

148 149 150 151 152 153 154 155

0 2000 4000 6000 8000

Depth

Decimal Day