-2.5-2-1.5-1-0.500.511.52

0246 8 ADCP oc445 7ens edited, npts = 44 phase 0.960.970.980.9911.011.021.03 05 10 amplitude 119119.5120120.5121121.5122

-40-200 20 days time: nav - pc

-35-30-25-20-15-10-50510

0510 15 time: nav - pc

2008- 5- 1 13:56