119 119.5 120 120.5 121 121.5 122 -20 0 20 40 60 80

days phase

ADCP oc445 7ens unedited, npts = 53

-1 -0.5 0 0.5 1 1.5 amplitude

119 119.5 120 120.5 121 121.5 122 -3 -2 -1 0 1 2

days

ADCP oc445 7ens edited, npts = 44

2008- 5- 1 13:56