119 119.5 120 120.5 121 121.5

0.955

0.96

0.965

0.97

0.975 scale

ADCP oc445 step size 1

119 119.5 120 120.5 121 121.5

-0.5

0

0.5

Angle

119 119.5 120 120.5 121 121.5 -5 0 5

Speed

119 119.5 120 120.5 121 121.5

-180 -90 0 90 180

Heading 2008/05/01 13:56:43 btcaluv.m step: 1, mean ph: 0.0770, amp: 0.9667

119 119.5 120 120.5 121 121.5

0 2000 4000 6000 8000

Depth

Decimal Day