-2-101234

01020 30 ADCP oc425a 7ens edited, npts = 160 phase 0.950.960.970.980.9911.011.021.031.04

01020 30 amplitude 156158160162164166168

-40-200 20 days time: nav - pc

-35-30-25-20-15-10-50510

02040 60 time: nav - pc

2006- 6-17 8: 5