8 9 10 11 12 13 14 15 deg. C

ADCP -OS75BB (mean = magenta; last = blk)

157 158 159 160 161 162 163 164 165 166 167

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference