156.671 156.672 156.673 156.674 156.675 156.676 156.677

1.008

1.009

1.01

1.011 scale

ADCP oc425 step size 1

156.671 156.672 156.673 156.674 156.675 156.676 156.677 0.6 0.7 0.8 0.9 1

Angle

156.671 156.672 156.673 156.674 156.675 156.676 156.677 -5 0 5

Speed

156.671 156.672 156.673 156.674 156.675 156.676 156.677

-180 -90 0 90 180

Heading 2006/06/06 17:55:50 btcaluv.m step: 1, mean ph: 0.8375, amp: 1.0092

156.671 156.672 156.673 156.674 156.675 156.676 156.677

0 2000

4000

6000

Depth

Decimal Day