12.5 13 13.5 14 14.5 15 15.5 16 deg. C

ADCP -NB150/ (mean = magenta; last = blk)

156.67 156.68 156.69 156.7 156.71 156.72 156.73 156.74

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference