156.638 156.639 156.64 156.641 156.642 156.643 156.644 156.645 156.646 156.647 0

0.5

1 scale

ADCP oc425 step size 1

156.638 156.639 156.64 156.641 156.642 156.643 156.644 156.645 156.646 156.647 0

0.5

1

Angle

156.638 156.639 156.64 156.641 156.642 156.643 156.644 156.645 156.646 156.647 -5 0 5

Speed

156.638 156.639 156.64 156.641 156.642 156.643 156.644 156.645 156.646 156.647

-180 -90 0 90 180

Heading 2006/06/06 15:38:02 btcaluv.m step: 1, mean ph: NaN, amp: NaN

156.638 156.639 156.64 156.641 156.642 156.643 156.644 156.645 156.646 156.647

0 2000 4000 6000 8000

Depth

Decimal Day