25

26

27

28

29

30 deg. C

ADCP -OS75NB (mean = magenta; last = blk)

172 172.5 173 173.5 174 174.5 175 175.5 176 176.5 177

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference