-0.8-0.6-0.4-0.200.20.40.6 0.5 1 ADCP kn182_15b 7ens edited, npts = 8

phase 11.0051.011.015

0.51.5 2 amplitude 173173.5

174174.5

175175.5

176176.5 177 0246 8 days time: nav - pc

01234567 012 3 time: nav - pc

2006- 6-27 10:49