173.625 173.63 173.635 173.64 173.645

1.05

1.1

1.15 scale

ADCP kn182_15b step size 1

173.625 173.63 173.635 173.64 173.645 -8 -6 -4 -2 0

Angle

173.625 173.63 173.635 173.64 173.645 -5 0 5

Speed

173.625 173.63 173.635 173.64 173.645

-180 -90 0 90 180

Heading 2006/06/27 10:49:34 btcaluv.m step: 1, mean ph: -2.0105, amp: 1.0358

173.625 173.63 173.635 173.64 173.645

0 2000 4000 6000 8000

Depth

Decimal Day