0.10.20.30.40.50.60.70.8

0.51.5 2 ADCP kn182_15b 7ens edited, npts = 8

phase 0.994

0.996

0.998

11.002

1.004

1.006

1.008

1.01 012 3 amplitude 173173.5

174174.5

175175.5

176176.5 177 -10-505 10 days time: nav - pc

-8-6-4-202468

0.51.5 2 time: nav - pc

2006- 6-27 10:50