173 173.5 174 174.5 175 175.5 176 176.5 177 0

0.2

0.4

0.6

0.8

days phase

ADCP kn182_15b 7ens unedited, npts = 8

0.99

0.995 1 1.005

1.01

1.015 amplitude

173 173.5 174 174.5 175 175.5 176 176.5 177 0

0.2

0.4

0.6

0.8

days

ADCP kn182_15b 7ens edited, npts = 8

0.99

0.995 1 1.005

1.01

1.015

2006- 6-27 10:50