179.1 179.15 179.2 179.25 179.3 179.35 179.4 179.45 179.5 179.55 179.6 1

1.01

1.02 scale

ADCP kn18215f step size 1

179.1 179.15 179.2 179.25 179.3 179.35 179.4 179.45 179.5 179.55 179.6

-0.8

-0.6

-0.4

-0.2 0 0.2

Angle

179.1 179.15 179.2 179.25 179.3 179.35 179.4 179.45 179.5 179.55 179.6 -5 0 5

Speed

179.1 179.15 179.2 179.25 179.3 179.35 179.4 179.45 179.5 179.55 179.6

-180 -90 0 90 180

Heading 2006/06/29 15:15:52 btcaluv.m step: 1, mean ph: -0.2792, amp: 1.0094

179.1 179.15 179.2 179.25 179.3 179.35 179.4 179.45 179.5 179.55 179.6

0 1000

2000

3000

Depth

Decimal Day