146 147 148 149 150 151 152 153 154 1 1.005

1.01

1.015 scale

ADCP EN476 step size 1

146 147 148 149 150 151 152 153 154

-0.4

-0.2 0 0.2 0.4

Angle

146 147 148 149 150 151 152 153 154 -5 0 5

Speed

146 147 148 149 150 151 152 153 154

-180 -90 0 90 180

Heading 2010/06/04 15:17:08 btcaluv.m step: 1, mean ph: 0.0351, amp: 1.0066

146 147 148 149 150 151 152 153 154

0 200 400 600

Depth

Decimal Day