9 10 11 12 13 14 15 16 17 18 deg. C

ADCP -OS75BB (mean = magenta; last = blk)

146 147 148 149 150 151 152 153 154

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference