-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 0

10

20 ADCP EN476 7ens edited, npts = 139

phase

0.98 0.99 1 1.01 1.02 1.03 1.04 1.05 1.06 0 5 10 15

amplitude

145 146 147 148 149 150 151 152 153 154

-100 -50 0 50

days time: nav - pc

-60 -40 -20 0 20 40 60 0

20

40

time: nav - pc

2010- 6- 4 15:16