9 10 11 12 13 14 15 16 17 18 19

-200

-180

-160

-140

-120

-100

-80

-60

-40

-20

0

Temperature

Depth discrete finite volume

-0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02

-200

-180

-160

-140

-120

-100

-80

-60

-40

-20

0 Discrete minus Finite Volume Profile

Temperature

Depth