61.5 62 62.5 63 63.5 64 64.5 65 31

31.5

32

32.5

33

Longitude

Latitude

Temperature (120m)

18

18.5

19

19.5

61.5 62 62.5 63 63.5 64 64.5 65 31

31.5

32

32.5

33

Longitude

Latitude

Chlorophyll a (60m)

0.08 0.1 0.12 0.14 0.16 0.18 0.2 0.22

61.5 62 62.5 63 63.5 64 64.5 65 31

31.5

32

32.5

33

Longitude

Nitrate + Nitrite (120m)

0 0.5 1 1.5 2 2.5