0 0.2 0.4 0.6

Chl a (mg/m 3)

71 m

18 18.2

18.4

18.6

18.8 19 19.2

19.4

19.6

19.8

Temperature (C)

25m

45m 60m

71m

120m

150m

180 185 190 195 200 205 210 0.4 0.45 0.5 0.55 c660 (m -1)

Year Day (1995) June 29 July 9 July 19 July 29

71 m

0 0.5 1 1.5

NO3 (uM)

80 m